Ok, now we include the plot, with the standard fontsize, with 7cm height, and the with of it equals to the linewidth. This is a reeeaaally awful figure, just like many webpages, where the webmaster wants to demonstrate how well he knows html and how many different and ugly styles he can use... Now this was indeed my motivation

x x

Ok, now we include the same plot again with different size, and the fontsize in the document has changed in between to Large, as well. Note, that the legendbox in the lower right corner has automatically extenended to include the text with the larger fonts, though we included exactly the same figure, with no modification. Let’s see the result, if it still looks fine (also, switch on layer 2, so that additional graphs are visible, and switch off layer ’grid’), with this command:

\blopeps[loff=grid,lon=2,text={annotation},width=0.8\linewidth,height=11cm,ps=3mm,lw=0.5mm]{picture.beps}} (... yes, it does :-)